X (mm)

0 10

20 30

40 50

60 70 80

Y (mm)

0 2 4 6 8 10 12 14

0 buttons/glass for sector9000_module2

Flatness surface contour of

Meas. Surface Height - Flat Plane Fit (microns)

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

0.5

1

1.5

2

2.5

3

Buttons/Glass: Residuals of fit to plane h1

Entries 12 Mean 4.658 RMS 7.685 Underflow 1 Overflow 0

Buttons/Glass: Residuals of fit to plane

X (mm)

0 10

2030

40 50

6070 80

Y (mm)

-40 -30 -20 -10 0 10 -100 -80 -60 -40 -20 0 carbon surface for sector9000_module2

Flatness surface contour of

Meas. Surface Height - Flat Plane Fit (microns)

-150 -100 -50 0 50 100 150 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Carbon Surface: Residuals of fit to plane h2

Entries 12

Mean -2.166e-007

RMS 15.57

Underflow 0

Overflow 0

Carbon Surface: Residuals of fit to plane

X (mm)

2224

2628

3032

3436

3840

4244

Y (mm)

-60 -50 -40 -30 -20 -10 0 50 100 150 200 250 300

module sector9000_module2

Flatness surface contour of

Meas. Surface Height - Flat Plane Fit (microns)

-200 -150 -100 -50 0 50 100 150 200 0

0.5

1

1.5

2

2.5

3

Module: Residuals of fit to plane h3

Entries 32

Mean 8.669e-008

RMS 18.53

Underflow 0

Overflow 0

Module: Residuals of fit to plane

X (mm)

2224

2628

3032

3436

3840

4244

Y (mm)

-60 -50 -40 -30 -20 -10 0 50 100 150 200 250 300 350

above carbon surface plane

Height of sector9000_module2

Height from carbon surface plane (microns)

50 100 150 200 250 300 350 400 450 500 550 0

0.5

1

1.5

2

2.5

3

Module: Height from carbon plane h10

Entries 32 Mean 301.9 RMS 19.1 Underflow 0 Overflow 0

Module: Height from carbon plane